%&LaTeX
\documentclass{article}

\usepackage[utf8]{inputenc}
\usepackage[T1]{fontenc}
\usepackage{textcomp}

\begin{document}

\begin{thebibliography}{1}

\bibitem{Nixon_etal1986} Nixon, A. D., Law, R., Officer, J. A., Cleland, J. F., \& Goldwater, P. N. (1986). Methods and devices : simple device to prevent accidental needle-prick injuries. \textit{The Lancet}, (19.04.1986), 888--889.

\end{thebibliography}

\end{document}

